
USE parts;

SELECT CONCAT('WARNING: Table ', TABLE_SCHEMA, '.', TABLE_NAME, ' already exists.') AS msg_warning 
FROM INFORMATION_SCHEMA.TABLES 
WHERE 
        TABLE_SCHEMA = 'parts' 
    AND TABLE_NAME = 'DOG_Lighting_Level_Audit'
;

CREATE TABLE IF NOT EXISTS parts.DOG_Lighting_Level_Audit (
	  id_audit INT NOT NULL AUTO_INCREMENT PRIMARY KEY
	, id_lighting_level INT NOT NULL
	, CONSTRAINT FK_DOG_Lighting_Level_Audit_id_lighting_level
		FOREIGN KEY (id_lighting_level)
		REFERENCES parts.DOG_Lighting_Level(id_lighting_level)
	, name_field VARCHAR(100) NOT NULL
	, value_prev TEXT
	, value_new TEXT
	, id_change_set INT NOT NULL
	, CONSTRAINT FK_DOG_Lighting_Level_Audit_id_change_set
		FOREIGN KEY (id_change_set) 
		REFERENCES parts.DOG_Dog_Change_Set(id_change_set)
);
