  https://www.molly.teddy.org.uk/login_callback, http://www.molly.teddy.org.uk/login_callback
, https://molly.teddy.org.uk/login_callback, http://molly.teddy.org.uk/login_callback
, https://www.fetch-metrics.co.uk/login_callback, http://www.fetch-metrics.co.uk/login_callback
, https://fetch-metrics.co.uk/login_callback, http://fetch-metrics.co.uk/login_callback
, https://www.fetch-metrics.com/login_callback, http://www.fetch-metrics.com/login_callback
, https://fetch-metrics.com/login_callback, http://fetch-metrics.com/login_callback
, http://127.0.0.1:5000/login_callback

http://www.molly.teddy.org.uk/, https://www.molly.teddy.org.uk/, 
http://molly.teddy.org.uk/, https://molly.teddy.org.uk/, 
http://www.molly.teddy.org.uk/logout, https://www.molly.teddy.org.uk/logout, 
http://molly.teddy.org.uk/logout, https://molly.teddy.org.uk/logout, 
http://www.molly.teddy.org.uk/logout_callback, https://www.molly.teddy.org.uk/logout_callback, 
http://molly.teddy.org.uk/logout_callback, https://molly.teddy.org.uk/logout_callback, 
http://127.0.0.1:5000/logout, http://127.0.0.1:5000/logout_callback